lane# sample

            1  IEF stds (from anode: 4.2, 4.6, 5.1, 5.4, 5.9, 6.6)

            2  Carlo

            3  Ant/gtor/hed hurts

            4  Ken

            5  IEF stds

            6  Lena

            7  Brett

            8  Vic

                                                                      ANODE (pH 3)

                                                                            CATHODE (pH 9)

                                                                                                            6.6

                                                                                                            4.2